Statistical uncertainty in R (ΔR/R %)

10

10^2

10^{-4} 10^{-3} 10^{-2} x

Q^2 GeV^2 n_{sig. Ο 1} = 24 n_{sig. Ο 2} = 12 n_{sig. Ο 3} = 7 ΛΔR/RΓ = 54.3

P = 820.00, 820.00 (GeV) A = 27.50, 17.88 (GeV) L = 6.77, 6.77 (pb^{-1}) E Γ 5.00 (GeV) Resolution effects not included but finder acceptance is folded in.