0 1 2 x=5.0e-5 GRV94

F_2

0 1 2 x=7.0e-5 0 1 2 x=1.2e-4 0 1 2 x=2.1e-4 Zeus94(s) Zeus94(n) Zeus93 E665 NMC 0 1 2 x=4.2e-4 0 1 2 x=7.1e-4 0 1 2 x=8.5e-4 0 1 2 x=1.6e-3 0 1 2 x=2.7e-3 0 1 2 x=4.0e-3 0 1 2 x=7.7e-3 0 1 2 x=0.011 0 1 2 x=0.028 0 1 2 x=0.05 0 1 2 x=0.11 0 1 2

1 10 10^2 10^3 10^4

Q^2

x=0.2