ZEUS trigger rate 1992-1994

Luminosity (cm-2 s-1)

(Hz)

1993 FLT

1993 SLT

1993 TLT

1994 FLT

1994 SLT

1994 TLT

1992(Oct) FLT

1992(Oct) TLT

SLT

Backgroud rate (C5) (x 0.5)

1

10

10^2

10^3

10^4

10^{28} 10^{29} 10^{30} 10^{31}